2ρ 1 1.5

]^{-3} | [10 cb |V× G(1)

30

40

50

HFAG

ICHEP08

CLEO

BELLE

BABAR global fit

BABAR tagged

AVERAGE

= 1 2χΔ

/dof = 1.2/ 8 2χ