]^{-3} 10 ×| [ ub|V

0 2 4

< 16 2 Ball-Zwicky q

0.12 + 0.55 - 0.37 ± 3.34

> 16 2 HPQCD q

0.20 + 0.59 - 0.39 ± 3.40

> 16 2 FNAL q

0.22 + 0.63 - 0.41 ± 3.62

HFAG

ICHEP08